= Specification

== xa000

Version: 0.0.0.0

Serial numbers, MAC addresses, and similiar identifiers are not included due to security and privacy issues.

Quantities of each component are denoted within parenthesis after the component details.

Non-applicable value: N/A
Unknown value: ?

=== Motherboard

[%autowidth]
|===
|Manufacturer |Model |Form Factor |Chipset(s) |CPU Socket(s) |Memory Slot(s) |I/O Controller(s) |Expansion Slot(s) |Network |Audio |Rear Panel

|Gigabyte
|A520M H
|mATX
a|

* AMD A520 (1)

a|

* AMD AM4 (1)

a|

* DDR4 (2)
* 64 GiB maximum
* Dual-channel

a|

* iTE (1)

a|*CPU*

* PCIe 3.0 x16 (1)
* M.2 (M-Key) PCIe 3.0 x4 (1)

*AMD B550*

* PCIe 3.0 x1 (2)
* SATA 6 Gb/s (4)
* USB 3.2 Gen 1 USB-A (2)
* USB 2.0 USB-A (4)

a|

* Realtek RTL8168H 1 Gb/s (1)

a|

* Realtek (1)

a|

* PS/2 keyboard/mouse combo (1)
* RJ45 (1)
* OFC audio (3)

*CPU*

* HDMI (1)
* DVI (1)
* USB 3.2 Gen 1 USB-A (4)
* USB 2.0 USB-A (2)

|===

=== CPU

Note: Simultaneous Multithreading (SMT) is disabled for security purposes; thread count is equal to core count

[%autowidth]
|===
|Manufacturer |Model |Microarchitecture |Core Count |Thread Count |Frequency - Base (GHz) |Frequency - Boost (GHz) |Cache - L1 |Cache - L2 |Cache - L3 |Integrated Graphics |PCIe Version |PCIe Lane Count |Process (nm) |Thermal Dissipation Power (W) |Maximum Operating Temperature (°C) |Thermal Interface Material |Cooling System

|AMD
|Ryzen 3 3200G
|Zen+
|4
|4
|3.60
|4.00
|384 KiB
|2 MiB
|4 MiB
|AMD Radeon Vega 8
|3.0 x8
|20
|12
|65
|95
|ID-Cooling Frost X25
|AMD Wraith Stealth
|===

=== Video

[%autowidth]
|===
|Manufacturer |Model |Graphics Processing Unit |Microarchitecture |Compute Units |Ray Accelerators |Render Output Units |Frequency - Base (MHz) |Frequency - Boost (MHz) |Cache |Memory Type |Memory Capacity |Memory Interface |Memory Bandwidth |Memory Bandwidth (Effective) |PCIe Version |TFLOPS - Half-precision |TFLOPS - Single-precision |Process (nm) |Thermal Dissipation Power (W) |Maximum Operating Temperature (°C) |Thermal Interface Material |Cooling System

|AMD
|Radeon Vega 8
|AMD Radeon Vega 8
|Vega
|8
|?
|8
|?
|1250
|?
|?
|64 MiB (shared)
|?
|?
|?
|?
|?
|?
|?
|?
|ID-Cooling Frost X25
|AMD Wraith Stealth
|===

=== Memory

[%autowidth]
|===
|Manufacturer |Model |Capacity |Speed (MT/s) |Error Correcting Code (ECC) |Module Count |Channel Mode

|Crucial
|CT8G4DFRA266.C8FJ
|8 GiB
|2666
|No
|1
|Dual-channel

|Crucial
|CT8G4DFRA266.M4FF
|8 GiB
|2666
|No
|1
|Dual-channel
|===

|===
|Total Capacity

|16 GiB
|===

=== Storage

[%autowidth]
|===
|Manufacturer |Model |Type |Capacity |Revolutions Per Minute |Write Speed |Read Speed |Cache |Terabytes Written |Device Count

|Crucial
|CT500P3PSSD8
|NVMe (PCIe 4.0 x4) (running at PCIe 3.0 x4)
|500 GB
|N/A
|4200 MB/s
|5000 MB/s
|N/A
|440
|1

|Seagate
|ST4000VN006-3CW104
|SATA (6 Gb/s)
|4 TB
|5400
|202 MB/s
|202 MB/s
|256 MiB
|180/year
|2
|===

=== Network

[%autowidth]
|===
|Manufacturer |Model |Type |NIC |Bandwidth

|Gigabyte
|A520M H
|NIC
|Realtek RTL8168H
a|

* 1 Gb/s
* 100 Mb/s
* 10/Mb/s

|TP-Link
|TX201
|NIC
|Realtek RTL8125B
a|

* 2.5 Gb/s
* 1 Gb/s
* 100 Mb/s
* 10 Mb/s

|===

=== Audio

[%autowidth]
|===
|Manufacturer |Model |Type |Audio Chip

|Giagbyte
|A520M H
|Audio chip
|Realtek
|===

=== Case

[%autowidth]
|===
|Manufacturer |Model |Form Factor |Cooling System - Intake |Cooling System - Exhaust

|Fractal Design
|Core 1000
|mATX
|Fractal Design Silent Series R2 120 mm (1)
|N/A
|===

=== Display

[%autowidth]
|===
|Manufacturer |Model |Size (cm) |Resolution |Refresh Rate (Hz) |Connections

|N/A
|N/A
|N/A
|N/A
|N/A
|N/A
|===

=== Keyboard

[%autowidth]
|===
|Manufacturer |Model |Key Switch Type

|N/A
|N/A
|N/A
|===

=== Mouse

[%autowidth]
|===
|Manufacturer |Model

|N/A
|N/A
|===
